From e8a3864bca84196a20c6d5566671852b6e80370e Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Tue, 30 Jan 2007 05:01:00 +0000
Subject: Fix reporting bug using expect, affecting (not fixing) Debian bug
 #392610: check_jabber always return warning

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1596 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_tcp.c b/plugins/check_tcp.c
index 7e1bd38..8187bcd 100644
--- a/plugins/check_tcp.c
+++ b/plugins/check_tcp.c
@@ -347,7 +347,10 @@ main (int argc, char **argv)
 	if(match == -2 && len && !(flags & FLAG_HIDE_OUTPUT))
 		printf("Unexpected response from host/socket: %s", status);
 	else {
-		printf("%.3f second response time on ", elapsed_time);
+		if(match == -2)
+			printf("Unexpected response from host/socket on ");
+		else
+			printf("%.3f second response time on ", elapsed_time);
 		if(server_address[0] != '/')
 			printf("port %d", server_port);
 		else
@@ -358,17 +361,24 @@ main (int argc, char **argv)
 		printf (" [%s]", status);
 
 	/* perf-data doesn't apply when server doesn't talk properly,
-	 * so print all zeroes on warn and crit */
+	 * so print all zeroes on warn and criti. Use fperfdata since
+	 * localisation settings can make different outputs */
 	if(match == -2)
-		printf ("|time=%fs;0.0;0.0;0.0;0.0", elapsed_time);
+		printf ("|%s",
+				fperfdata ("time", elapsed_time, "s",
+				TRUE, 0,
+				TRUE, 0,
+				TRUE, 0,
+				TRUE, socket_timeout)
+			);
 	else
 		printf("|%s",
 				fperfdata ("time", elapsed_time, "s",
-		                   TRUE, warning_time,
-		                   TRUE, critical_time,
-		                   TRUE, 0,
-		                   TRUE, socket_timeout)
-		      );
+				TRUE, warning_time,
+				TRUE, critical_time,
+				TRUE, 0,
+				TRUE, socket_timeout)
+			);
 
 	putchar('\n');
 	return result;
diff --git a/plugins/t/check_tcp.t b/plugins/t/check_tcp.t
index ffe559d..67e527a 100644
--- a/plugins/t/check_tcp.t
+++ b/plugins/t/check_tcp.t
@@ -10,7 +10,7 @@ use Test;
 use NPTest;
 
 use vars qw($tests);
-BEGIN {$tests = 5; plan tests => $tests}
+BEGIN {$tests = 7; plan tests => $tests}
 
 my $host_tcp_http      = getTestParameter( "host_tcp_http",      "NP_HOST_TCP_HTTP",      "localhost",
 					   "A host providing the HTTP Service (a web server)" );
@@ -23,12 +23,15 @@ my $hostname_invalid   = getTestParameter( "hostname_invalid",   "NP_HOSTNAME_IN
 
 my $successOutput = '/^TCP OK\s-\s+[0-9]?\.?[0-9]+ second response time on port [0-9]+/';
 
+my $failedExpect = '/^TCP WARNING\s-\sUnexpected response from host/socket on port [0-9]+/';
+
 my $t;
 
 $t += checkCmd( "./check_tcp $host_tcp_http      -p 80 -wt 300 -ct 600",       0, $successOutput );
 $t += checkCmd( "./check_tcp $host_tcp_http      -p 81 -wt   0 -ct   0 -to 1", 2 ); # use invalid port for this test
 $t += checkCmd( "./check_tcp $host_nonresponsive -p 80 -wt   0 -ct   0 -to 1", 2 );
 $t += checkCmd( "./check_tcp $hostname_invalid   -p 80 -wt   0 -ct   0 -to 1", 2 );
+$t += checkCmd( "./check_tcp $host_tcp_http      -p 80 -s 'GET /\n' -e 'ThisShouldntMatch' -j", 1, $failedExpect );
 
 exit(0) if defined($Test::Harness::VERSION);
 exit($tests - $t);
-- 
cgit v0.10-9-g596f

