From edff8ae40c43b50680d28a59225a674c4fd59a5e Mon Sep 17 00:00:00 2001
From: Stanley Hopcroft <stanleyhopcroft@users.sourceforge.net>
Date: Mon, 24 Jan 2005 23:15:50 +0000
Subject: Notes about check_dhcp and check_icmp (no longer built by default,
 use at own peril, volatile)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1094 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/CHANGES b/CHANGES
index 562d8cf..d837f1d 100644
--- a/CHANGES
+++ b/CHANGES
@@ -9,3 +9,15 @@ This file documents the major additions and syntax changes between releases.
 	check_swap % thresholds changed to measure amount free, instead of amount used
 	check_disk syntax changes for -p, -m/-M, defaults to MB instead of kB
 	check_procs -C expects no path for the command name
+	New plugins - check_dhcp, check_icmp
+
+Caveats, Notes
+
+1 check_dhcp and check_icmp may not build or run on all architectures. Both plugins should be regarded
+  as volatile (subject to change - see the CVS if in doubt). cd plugins && make plugin' to build.
+
+1.1 check_dhcp: tested successfully on Linux and FreeBSD; fails on Solaris 9; unknown on HPUX and AIX
+1.2 check_icmp: recently renamed by the author (A Ericsson) to 'check_rta' and substantially updated.
+		check_icmp is known to run on *FreeBSD.
+
+
-- 
cgit v0.10-9-g596f

