From eff6bae7ed30f6f262670736cc94700e91dcdc75 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Thu, 3 Feb 2005 23:51:35 +0000
Subject: Check for log file readability

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1129 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins-scripts/check_log.sh b/plugins-scripts/check_log.sh
index 355bd01..0da732d 100755
--- a/plugins-scripts/check_log.sh
+++ b/plugins-scripts/check_log.sh
@@ -167,6 +167,9 @@ done
 if [ ! -e $logfile ]; then
     $ECHO "Log check error: Log file $logfile does not exist!\n"
     exit $STATE_UNKNOWN
+elif [ ! -r $logfile ] ; then
+    $ECHO "Log check error: Log file $logfile is not readable!\n"
+    exit $STATE_UNKNOWN
 fi
 
 # If the old log file doesn't exist, this must be the first time
-- 
cgit v0.10-9-g596f

