From f24f2853c598bdde9041f84de77ec47fa1116870 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 8 Mar 2005 06:19:32 +0000
Subject: Added OS info for offset issue

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1149 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins-scripts/check_ntp.pl b/plugins-scripts/check_ntp.pl
index 8b5fe4d..82c97ce 100755
--- a/plugins-scripts/check_ntp.pl
+++ b/plugins-scripts/check_ntp.pl
@@ -217,7 +217,7 @@ while (<NTPDATE>) {
 		# An offset of 0.000000 with an error is probably bogus. Actually,
 		# it's probably always bogus, but let's be paranoid here.
 		# Has been reported that 0.0000 happens in a production environment
-		# so this check should be taken out - SF tracker 1150777
+		# on Solaris 8 so this check should be taken out - SF tracker 1150777
 		#if ($offset == 0) { undef $offset;}
 
 		$ntpdate_error = defined ($offset) ? $ERRORS{"OK"} : $ERRORS{"CRITICAL"};
-- 
cgit v0.10-9-g596f

