From f6bfe34a3e3c8c46c2cb5fc728773c2f4b191c8f Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Fri, 24 Mar 2006 16:13:40 +0000
Subject: Tests converted to new style

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1354 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_hpjd.t b/plugins/t/check_hpjd.t
index b749c77..2fe5600 100644
--- a/plugins/t/check_hpjd.t
+++ b/plugins/t/check_hpjd.t
@@ -6,37 +6,46 @@
 #
 
 use strict;
-use Test;
+use Test::More;
 use NPTest;
 
-use vars qw($tests);
-BEGIN {$tests = 5; plan tests => $tests}
+plan skip_all => "check_hpjd not compiled" unless (-x "check_hpjd");
+
+plan tests => 5;
 
 my $successOutput = '/^Printer ok - /';
 my $failureOutput = '/Timeout: No [Rr]esponse from /';
 
-my $host_tcp_hpjd      = getTestParameter( "host_tcp_hpjd",      "NP_HOST_TCP_HPJD",      undef,
-					   "A host (usually a printer) providing the HP-JetDirect Services" );
-
-my $host_nonresponsive = getTestParameter( "host_nonresponsive", "NP_HOST_NONRESPONSIVE", "10.0.0.1",
-					   "The hostname of system not responsive to network requests" );
-
-my $hostname_invalid   = getTestParameter( "hostname_invalid",   "NP_HOSTNAME_INVALID",   "nosuchhost",
-                                           "An invalid (not known to DNS) hostname" );
-
-my $t;
-
-if ( -x "./check_hpjd" )
-{
-  $t += checkCmd( "./check_hpjd $host_tcp_hpjd",      0, $successOutput );
-  $t += checkCmd( "./check_hpjd $host_nonresponsive", 2, $failureOutput );
-  $t += checkCmd( "./check_hpjd $hostname_invalid",   3 );
-}
-else
-{
-  $t += skipMissingCmd( "./check_hpjd", $tests );
+my $host_tcp_hpjd = getTestParameter( 
+			"NP_HOST_TCP_HPJD",
+			"A host (usually a printer) providing the HP-JetDirect Services"
+			);
+
+my $host_nonresponsive = getTestParameter( 
+			"NP_HOST_NONRESPONSIVE",
+			"The hostname of system not responsive to network requests",
+			"10.0.0.1",
+			);
+
+my $hostname_invalid = getTestParameter( 
+			"NP_HOSTNAME_INVALID",
+			"An invalid (not known to DNS) hostname",
+			"nosuchhost",
+			);
+
+my $res;
+
+SKIP: {
+	skip "No HP JetDirect defined", 2 unless $host_tcp_hpjd;
+	$res = NPTest->testCmd("./check_hpjd $host_tcp_hpjd");
+	cmp_ok( $res->return_code, '==', 0, "Jetdirect responding" );
+	like  ( $res->output, $successOutput, "Output correct" );
 }
 
-exit(0) if defined($Test::Harness::VERSION);
-exit($tests - $t);
+$res = NPTest->testCmd("./check_hpjd $host_nonresponsive");
+cmp_ok( $res->return_code, 'eq', 2, "Host not responding");
+like  ( $res->output, $failureOutput, "Output OK" );
+
+$res = NPTest->testCmd("./check_hpjd $hostname_invalid");
+cmp_ok( $res->return_code, 'eq', 3, "Hostname invalid");
 
diff --git a/plugins/t/check_http.t b/plugins/t/check_http.t
index 9b90fd0..24e4fd6 100644
--- a/plugins/t/check_http.t
+++ b/plugins/t/check_http.t
@@ -9,6 +9,8 @@ use strict;
 use Test::More;
 use NPTest;
 
+plan tests => 12;
+
 my $successOutput = '/OK.*HTTP.*second/';
 
 my $res;
@@ -25,9 +27,6 @@ my $hostname_invalid   = getTestParameter( "NP_HOSTNAME_INVALID",
 		"An invalid (not known to DNS) hostname",  
 		"nosuchhost");
 
-plan tests => 8;
-
-
 $res = NPTest->testCmd(
 	"./check_http $host_tcp_http -wt 300 -ct 600"
 	);
@@ -44,14 +43,29 @@ $res = NPTest->testCmd(
 	"./check_http $hostname_invalid -wt 1 -ct 2"
 	);
 cmp_ok( $res->return_code, '==', 2, "Webserver $hostname_invalid not valid" );
-like( $res->output, "/Name or service not known.*/", "Output OK");
+# The first part of the message comes from the OS catalogue, so cannot check this.
+# On Debian, it is Name or service not known, on Darwin, it is No address associated with nodename
+like( $res->output, "/Unable to open TCP socket/", "Output OK");
 
 $res = NPTest->testCmd(
 	"./check_http --ssl www.verisign.com"
 	);
 cmp_ok( $res->return_code, '==', 0, "Can read https for www.verisign.com" );
 
+$res = NPTest->testCmd( "./check_http -C 1 --ssl www.verisign.com" );
+cmp_ok( $res->return_code, '==', 0, "Checking certificate for www.verisign.com");
+like  ( $res->output, '/Certificate will expire on/', "Output OK" );
+my $saved_cert_output = $res->output;
+
+$res = NPTest->testCmd( "./check_http -C 1 www.verisign.com" );
+cmp_ok( $res->output, 'eq', $saved_cert_output, "--ssl option automatically added");
+
+$res = NPTest->testCmd( "./check_http www.verisign.com -C 1" );
+cmp_ok( $res->output, 'eq', $saved_cert_output, "Old syntax for cert checking still works");
+
 $res = NPTest->testCmd(
 	"./check_http --ssl www.e-paycobalt.com"
 	);
 cmp_ok( $res->return_code, "==", 0, "Can read https for www.e-paycobalt.com (uses AES certificate)" );
+
+	
-- 
cgit v0.10-9-g596f

