From feb2ca7a33e11956bc731e300a0f5a60f0c9f40f Mon Sep 17 00:00:00 2001
From: Karl DeBisschop <kdebisschop@users.sourceforge.net>
Date: Mon, 29 Apr 2002 02:58:22 +0000
Subject: failed to carry over from old plugins, listed in EXTRA_DIST, needed
 for build

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@18 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/getopt.h b/plugins/getopt.h
new file mode 100644
index 0000000..4ac33b7
--- /dev/null
+++ b/plugins/getopt.h
@@ -0,0 +1,129 @@
+/* Declarations for getopt.
+   Copyright (C) 1989, 90, 91, 92, 93, 94 Free Software Foundation, Inc.
+
+   This program is free software; you can redistribute it and/or modify it
+   under the terms of the GNU General Public License as published by the
+   Free Software Foundation; either version 2, or (at your option) any
+   later version.
+
+   This program is distributed in the hope that it will be useful,
+   but WITHOUT ANY WARRANTY; without even the implied warranty of
+   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
+   GNU General Public License for more details.
+
+   You should have received a copy of the GNU General Public License
+   along with this program; if not, write to the Free Software
+   Foundation, 675 Mass Ave, Cambridge, MA 02139, USA.  */
+
+#ifndef _GETOPT_H
+#define _GETOPT_H 1
+
+#ifdef	__cplusplus
+extern "C" {
+#endif
+
+/* For communication from `getopt' to the caller.
+   When `getopt' finds an option that takes an argument,
+   the argument value is returned here.
+   Also, when `ordering' is RETURN_IN_ORDER,
+   each non-option ARGV-element is returned here.  */
+
+extern char *optarg;
+
+/* Index in ARGV of the next element to be scanned.
+   This is used for communication to and from the caller
+   and for communication between successive calls to `getopt'.
+
+   On entry to `getopt', zero means this is the first call; initialize.
+
+   When `getopt' returns EOF, this is the index of the first of the
+   non-option elements that the caller should itself scan.
+
+   Otherwise, `optind' communicates from one call to the next
+   how much of ARGV has been scanned so far.  */
+
+extern int optind;
+
+/* Callers store zero here to inhibit the error message `getopt' prints
+   for unrecognized options.  */
+
+extern int opterr;
+
+/* Set to an option character which was unrecognized.  */
+
+extern int optopt;
+
+/* Describe the long-named options requested by the application.
+   The LONG_OPTIONS argument to getopt_long or getopt_long_only is a vector
+   of `struct option' terminated by an element containing a name which is
+   zero.
+
+   The field `has_arg' is:
+   no_argument		(or 0) if the option does not take an argument,
+   required_argument	(or 1) if the option requires an argument,
+   optional_argument 	(or 2) if the option takes an optional argument.
+
+   If the field `flag' is not NULL, it points to a variable that is set
+   to the value given in the field `val' when the option is found, but
+   left unchanged if the option is not found.
+
+   To have a long-named option do something other than set an `int' to
+   a compiled-in constant, such as set a value from `optarg', set the
+   option's `flag' field to zero and its `val' field to a nonzero
+   value (the equivalent single-letter option character, if there is
+   one).  For long options that have a zero `flag' field, `getopt'
+   returns the contents of the `val' field.  */
+
+struct option
+{
+#if defined (__STDC__) && __STDC__
+  const char *name;
+#else
+  char *name;
+#endif
+  /* has_arg can't be an enum because some compilers complain about
+     type mismatches in all the code that assumes it is an int.  */
+  int has_arg;
+  int *flag;
+  int val;
+};
+
+/* Names for the values of the `has_arg' field of `struct option'.  */
+
+#define	no_argument		0
+#define required_argument	1
+#define optional_argument	2
+
+#if defined (__STDC__) && __STDC__
+#ifdef __GNU_LIBRARY__
+/* Many other libraries have conflicting prototypes for getopt, with
+   differences in the consts, in stdlib.h.  To avoid compilation
+   errors, only prototype getopt for the GNU C library.  */
+extern int getopt (int argc, char *const *argv, const char *shortopts);
+#else /* not __GNU_LIBRARY__ */
+extern int getopt ();
+#endif /* __GNU_LIBRARY__ */
+extern int getopt_long (int argc, char *const *argv, const char *shortopts,
+		        const struct option *longopts, int *longind);
+extern int getopt_long_only (int argc, char *const *argv,
+			     const char *shortopts,
+		             const struct option *longopts, int *longind);
+
+/* Internal only.  Users should not call this directly.  */
+extern int _getopt_internal (int argc, char *const *argv,
+			     const char *shortopts,
+		             const struct option *longopts, int *longind,
+			     int long_only);
+#else /* not __STDC__ */
+extern int getopt ();
+extern int getopt_long ();
+extern int getopt_long_only ();
+
+extern int _getopt_internal ();
+#endif /* __STDC__ */
+
+#ifdef	__cplusplus
+}
+#endif
+
+#endif /* _GETOPT_H */
-- 
cgit v0.10-9-g596f

